Center at RA 15 07 04.78702 DEC -16 52 30.2696

CONT: 1504-166 IPOL 8418.771 MHZ 1504-166.ICL001.5

PLot file version 1 created 05-JAN-2004 11:48:45

Cont peak flux = 3.6553E-01 JY/BEAM Levs = 3.655E-01 * (-0.106, 0.106, 0.212, 0.425, 0.850)

MilliARC SEC

MilliARC SEC

40 20 0 -20 -40

50

40

30

20

10

0

-10

-20

-30

-40

-50