Center at RA 16 28 46.61979 DEC -14 15 41.8862

CONT: 1628-148 IPOL 8418.771 MHZ 1628-148.IIM001.1

PLot file version 1 created 05-JAN-2004 10:56:04

Cont peak flux = 9.5703E-02 JY/BEAM Levs = 9.570E-02 * (-0.317, 0.317, 0.635)

MilliARC SEC

MilliARC SEC

40 20 0 -20 -40

50

40

30

20

10

0

-10

-20

-30

-40

-50