Tsys vs UTC time for bf073c.MSORT.1 TY 1 Rpol IF 1 - 8

Plot file version 1 created 05-JAN-2004 10:53:22

1R EB IF 1 50 40 30 1R EB IF 2 50 40 30 1R EB IF 3 50 40 30 1R EB IF 4 50 40 30 1R EB IF 5 50 40 30 1R EB IF 6

Kelvin

50 40 30 1R EB IF 7 50 40 30 1R EB IF 8 50 40 30 2R WB IF 1

1.005 1.000 0.995

2R WB IF 2

TIME (HOURS)

17 18 19 20 21

1.005 1.000 0.995

Tsys vs UTC time for bf073c.MSORT.1 TY 1 Rpol IF 1 - 8

Plot file version 2 created 05-JAN-2004 10:53:22

2R WB IF 3

1.005 1.000 0.995

2R WB IF 4

1.005 1.000 0.995

2R WB IF 5

1.005 1.000 0.995

2R WB IF 6

1.005 1.000 0.995

2R WB IF 7

1.005 1.000 0.995

2R WB IF 8

Kelvin

1.005 1.000 0.995

3R HH IF 1 46 44 42 3R HH IF 2 46 44 42 3R HH IF 3 48 46 44 42 3R HH IF 4

TIME (HOURS)

17 18 19 20 21

48 46 44 42

Tsys vs UTC time for bf073c.MSORT.1 TY 1 Rpol IF 1 - 8

Plot file version 3 created 05-JAN-2004 10:53:22

3R HH IF 5 46 44 42 40 3R HH IF 6 48 46 44 3R HH IF 7 48 46 44 42 3R HH IF 8 48 46 44 42 4R NT IF 1 164 162 160 158 156 154 4R NT IF 2

Kelvin

150 145 140 4R NT IF 3 160 155 150 4R NT IF 4 160 155 150 4R NT IF 5 152 150 148 146 144 4R NT IF 6

TIME (HOURS)

17 18 19 20 21

154 152 150 148 146 144

Tsys vs UTC time for bf073c.MSORT.1 TY 1 Rpol IF 1 - 8

Plot file version 4 created 05-JAN-2004 10:53:22

4R NT IF 7 148 146 144 142 140 4R NT IF 8 150 145 140 5R SC IF 1 300 200 100 5R SC IF 2 250 200 150 100 50 5R SC IF 3 300 200 100 5R SC IF 4

Kelvin

300 200 100 5R SC IF 5 300 200 100 5R SC IF 6 300 200 100 5R SC IF 7 300 200 100 5R SC IF 8

TIME (HOURS)

17 18 19 20 21

300 200 100