Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 1 created 02-DEC-2004 13:34:10

1 EF IF 1R

0.010 0.005 0.000 -0.005

1 EF IF 1L

0.010 0.005 0.000 -0.005

1 EF IF 2R

0.010 0.005 0.000 -0.005

1 EF IF 2L

0.010 0.005 0.000 -0.005

1 EF IF 3R

0.010 0.005 0.000 -0.005

1 EF IF 3L

Degrees

0.010 0.005 0.000 -0.005

1 EF IF 4R

0.010 0.005 0.000 -0.005

1 EF IF 4L

0.010 0.005 0.000 -0.005

2 WB IF 2L

113.085 113.080 113.075 113.070

2 WB IF 4R

TIME (HOURS)

20 46 47 48 49 50 51 52 53 54 55

300 250 200 150

Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 2 created 02-DEC-2004 13:34:10

2 WB IF 4L

-132.920 -132.925 -132.930 -132.935 4 ON IF 1R 20 0 -20 4 ON IF 1L 20 0 -20 4 ON IF 2R 20 0 -20 4 ON IF 2L 20 0 -20 4 ON IF 3R

Degrees

20 0 -20 4 ON IF 3L 30 20 10 0 -10 4 ON IF 4R 20 10 0 -10 4 ON IF 4L 30 20 10 0 -10 5 TR IF 1R

TIME (HOURS)

20 46 47 48 49 50 51 52 53 54 55

5 0 -5 -10

Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 3 created 02-DEC-2004 13:34:10

5 TR IF 1L 10 5 0 5 TR IF 2R 0 -5 -10 5 TR IF 2L 10 5 0 5 TR IF 3R 0 -5 -10 5 TR IF 3L 5 0 -5 6 UR IF 1R

Degrees

10 0 -10 6 UR IF 2R 15 10 5 0 -5 6 UR IF 3R 10 0 -10 6 UR IF 3L 10 5 0 -5 6 UR IF 4R

TIME (HOURS)

20 46 47 48 49 50 51 52 53 54 55

10 5 0 -5

Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 4 created 02-DEC-2004 13:34:10

6 UR IF 4L

Degrees

TIME (HOURS)

20 46 47 48 49 50 51 52 53 54 55

10 5 0