Gain amp vs UTC time for J1832+1357.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 02-DEC-2004 13:35:05

1 EF IF 1R 984 982 980 978 976 1 EF IF 1L

1020 1015

1010 1005

1 EF IF 2R 995 990 985 980 975 1 EF IF 2L

1030

1020

1010

1 EF IF 3R 995 990 985 980 1 EF IF 3L

MilliGain

1015

1010

1005

1 EF IF 4R 980 970 960 1 EF IF 4L 995 990 985 2 WB IF 1R 950 945 940 935 2 WB IF 1L

TIME (HOURS)

18 47 30 48 00 30 49 00 30 50 00 30 51 00 30

955 950 945 940 935

Gain amp vs UTC time for J1832+1357.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 02-DEC-2004 13:35:05

2 WB IF 2R

1030 1020 1010 1000 990 2 WB IF 2L

1050 1040 1030 1020

2 WB IF 3R

1040 1030 1020 1010

2 WB IF 3L

1100 1090 1080

2 WB IF 4R 985 980 975 970 965 2 WB IF 4L

MilliGain

1005

1000 995 4 ON IF 1R 980 960 940 920 4 ON IF 1L 950 940 930 920 910 4 ON IF 2R 960 940 920 4 ON IF 2L

TIME (HOURS)

18 47 30 48 00 30 49 00 30 50 00 30 51 00 30

960 940 920 900

Gain amp vs UTC time for J1832+1357.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 02-DEC-2004 13:35:05

4 ON IF 3R 960 940 920 900 4 ON IF 3L 920 910 900 4 ON IF 4R 980 960 940 920 900 4 ON IF 4L 980 960 940 920 5 TR IF 1R

1035 1030 1025 1020

5 TR IF 1L

MilliGain

1340

1335 1330

5 TR IF 2R

1050

1040

1030

5 TR IF 2L

1325 1320 1315 1310

5 TR IF 3R 645 640 635 630 625 5 TR IF 3L

TIME (HOURS)

18 47 30 48 00 30 49 00 30 50 00 30 51 00 30

1040 1030 1020 1010

Gain amp vs UTC time for J1832+1357.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 02-DEC-2004 13:35:05

6 UR IF 1R

1050 1000 950 6 UR IF 2R

1020 1000 980 960 940 920 6 UR IF 3R

1000 950 900 6 UR IF 3L

1000 950 900 6 UR IF 4R

1050 1000 950 900 6 UR IF 4L

MilliGain

TIME (HOURS)

18 47 30 48 00 30 49 00 30 50 00 30 51 00 30

1050

1000 950