Gain amp vs UTC time for 3C48.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 07-FEB-2006 17:57:47

1 JB IF 1R 2.0 1.5 1.0 1 JB IF 1L 2.0 1.5 1.0 1 JB IF 2R 2.5 2.0 1.5 1.0 0.5 1 JB IF 2L 1.6 1.4 1.2 1.0 0.8 1 JB IF 3R 2.0 1.5 1.0 0.5 1 JB IF 3L

Gain

1.6 1.4 1.2 1.0 0.8 0.6 1 JB IF 4R 1.4 1.2 1.0 0.8 1 JB IF 4L 1.2 1.0 0.8 2 WB IF 1R 1.5 1.0 0.5 2 WB IF 1L

TIME (HOURS)

02 04 06 08 10 12 14

1.4 1.2 1.0 0.8 0.6 0.4

Gain amp vs UTC time for 3C48.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 07-FEB-2006 17:57:47

2 WB IF 2R 1.6 1.4 1.2 1.0 0.8 2 WB IF 2L 1.5 1.0 2 WB IF 3R 2.0 1.5 1.0 2 WB IF 3L 2.0 1.5 1.0 2 WB IF 4R 1.2 1.0 0.8 0.6 2 WB IF 4L

Gain

1.2 1.0 0.8 3 EB IF 1R 0.6 0.5 0.4 0.3 3 EB IF 1L 0.7 0.6 0.5 0.4 0.3 3 EB IF 2R 0.7 0.6 0.5 0.4 3 EB IF 2L

TIME (HOURS)

02 04 06 08 10 12 14

0.8 0.6 0.4

Gain amp vs UTC time for 3C48.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 07-FEB-2006 17:57:47

3 EB IF 3R 0.6 0.4 0.2 3 EB IF 3L 0.7 0.6 0.5 0.4 3 EB IF 4R 0.7 0.6 0.5 0.4 3 EB IF 4L 0.7 0.6 0.5 0.4 4 ON IF 1R 2.5 2.0 1.5 1.0 4 ON IF 1L

Gain

2.0 1.5 1.0 4 ON IF 2R 1.5 1.0 4 ON IF 2L 1.6 1.4 1.2 1.0 0.8 4 ON IF 3R 1.5 1.0 0.5 4 ON IF 3L

TIME (HOURS)

02 04 06 08 10 12 14

1.5 1.0

Gain amp vs UTC time for 3C48.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 07-FEB-2006 17:57:47

4 ON IF 4R 1.1 1.0 0.9 0.8 0.7 4 ON IF 4L 1.6 1.4 1.2 1.0 0.8 0.6 5 MC IF 1R 1.7 1.6 1.5 1.4 1.3 5 MC IF 1L 1.4 1.3 1.2 5 MC IF 2R 3 2 1 5 MC IF 2L

Gain

3 2 1 5 MC IF 3R 3 2 1 5 MC IF 3L 3 2 1 5 MC IF 4R 2.5 2.0 1.5 5 MC IF 4L

TIME (HOURS)

02 04 06 08 10 12 14

2.5 2.0 1.5

Gain amp vs UTC time for 3C48.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 5 created 07-FEB-2006 17:57:47

7 TR IF 1R 1.6 1.4 1.2 1.0 0.8 7 TR IF 1L 1.4 1.2 1.0 0.8 7 TR IF 2L 1.6 1.4 1.2 1.0 0.8 7 TR IF 3R 1.6 1.4 1.2 1.0 0.8 0.6 7 TR IF 3L 1.6 1.4 1.2 1.0 0.8 7 TR IF 4R

Gain

1.0 0.9 0.8 0.7 7 TR IF 4L 1.0 0.9 0.8 0.7 8 SH IF 1R

1.445 1.440 1.435 1.430

8 SH IF 1L

1.800 1.795 1.790 1.785

8 SH IF 2R

TIME (HOURS)

02 04 06 08 10 12 14

2.5 2.0 1.5

Gain amp vs UTC time for 3C48.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 6 created 07-FEB-2006 17:57:47

8 SH IF 2L

1.310 1.305 1.300 1.295

8 SH IF 3R

2.920 2.915 2.910 2.905

8 SH IF 4L 3.1 3.0 2.9 2.8 2.7 9 UR IF 1R 1.6 1.4 1.2 9 UR IF 1L 2.0 1.5 1.0 9 UR IF 2R

Gain

1.675 1.670 1.665 1.660

9 UR IF 2L 1.5 1.0 0.5 9 UR IF 3R

1.270 1.265 1.260 1.255

9 UR IF 3L 2.5 2.0 1.5 9 UR IF 4R

TIME (HOURS)

02 04 06 08 10 12 14

1.290 1.285 1.280 1.275

Gain amp vs UTC time for 3C48.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 7 created 07-FEB-2006 17:57:47

10 HH IF 1R 1.4 1.2 1.0 0.8 0.6 10 HH IF 1L 2.0 1.8 1.6 1.4 10 HH IF 2R 2.0 1.5 1.0 10 HH IF 2L 2.5 2.0 1.5 1.0 10 HH IF 3R

1.50 1.45 1.40 1.35

10 HH IF 3L

Gain

1.7 1.6 1.5 10 HH IF 4R

1.36 1.34 1.32 1.30 1.28

10 HH IF 4L 1.5 1.4 1.3 1.2 11 CM IF 1R 24 23 22 21 11 CM IF 1L

TIME (HOURS)

02 04 06 08 10 12 14

39 38 37 36

Gain amp vs UTC time for 3C48.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 8 created 07-FEB-2006 17:57:47

11 CM IF 2R 1.4 1.2 1.0 0.8 0.6 0.4 11 CM IF 2L 1.5 1.0 0.5 11 CM IF 3R 1.4 1.2 1.0 0.8 0.6 11 CM IF 3L

Gain

TIME (HOURS)

02 04 06 08 10 12 14

1.2 1.0 0.8 0.6 0.4