Center at RA 01 37 41.29950 DEC 33 09 35.1338

CONT: 3C48 IPOL 1652.803 MHZ 3C48.ICL001.3

PLot file version 1 created 07-FEB-2006 17:58:07

Cont peak flux = 1.3918E+00 JY/BEAM Levs = 1.392E-02 * (-5.73, 5.732, 11.46, 22.93, 45.86, 91.72)

MilliARC SEC

MilliARC SEC

200 150 100 50 0 -50 -100 -150 -200

200

150

100

50

0

-50

-100

-150

-200