Center at RA 01 37 41.29950 DEC 33 09 35.1338

CONT: 3C48 IPOL 1652.803 MHZ 3C48.IIM001.1

PLot file version 1 created 07-FEB-2006 17:56:11

Cont peak flux = 5.1749E-01 JY/BEAM Levs = 5.175E-03 * (-12.2, 12.24, 24.48, 48.95, 97.90)

MilliARC SEC

MilliARC SEC

200 150 100 50 0 -50 -100 -150 -200

200

150

100

50

0

-50

-100

-150

-200