Center at RA 05 55 30.80561 DEC 39 48 49.1650

CONT: DA193 IPOL 1652.803 MHZ DA193.ICL001.1

PLot file version 1 created 07-FEB-2006 17:56:51

Cont peak flux = 3.1363E+00 JY/BEAM Levs = 3.136E-02 * (-8.80, 8.803, 17.61, 35.21, 70.42)

MilliARC SEC

MilliARC SEC

200 150 100 50 0 -50 -100 -150 -200

200

150

100

50

0

-50

-100

-150

-200