Gain amp vs UTC time for J1229+0203.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 10-JUN-2002 22:50:08

1R EB

1400 1200 1000

2R JB

1300 1200 1100 1000 900 3R MC

1400 1200 1000 800 4R NT

1100 1000 900 5R TR

1200 1100 1000

6R WB

MilliGain

950 900 850 800 7R ON

TIME (HOURS)

16 17 18 19 20 21

1100 1000 900

Gain amp vs UTC time for J1229+0203.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 10-JUN-2002 22:50:12

1R EB 1.4 1.2 1.0 2R JB 1.0 0.8 0.6 3R MC

1.61.4 1.21.0 0.80.6

4R NT

0.95 0.90 0.85

5R TR

1.15 1.10 1.05 1.00 0.95

6R WB

Gain

0.95 0.90 0.85 7R ON 1.1 1.0 0.9 8R CM

TIME (HOURS)

16 17 18 19 20 21

1.6 1.4 1.2 1.0 0.8 0.6

Gain amp vs UTC time for J1229+0203.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 10-JUN-2002 22:50:16

1R EB

1200 1000 800 2R JB 950 900 850 800 750 3R MC

1200 1000 800 4R NT

1000 900 800 6R WB 950 900 850 7R ON

MilliGain

1000 900 800 8R CM

TIME (HOURS)

16 17 18 19 20 21

900 800 700

Gain amp vs UTC time for J1229+0203.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 10-JUN-2002 22:50:20

1R EB 1.2 1.0 0.8 2R JB 0.9 0.8 0.7 0.6 3R MC 1.4 1.2 1.0 0.8 0.6 4R NT 1.1 1.0 0.9 5R TR

1.10 1.05 1.00 0.95

6R WB

Gain

1.3 1.2 1.1 1.0 7R ON

TIME (HOURS)

16 17 18 19 20 21

1.15 1.10 1.05 1.00 0.95

Gain amp vs UTC time for J1229+0203.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 10-JUN-2002 22:50:24

1L EB

1400 1200 1000

2L JB 900 800 700 600 3L MC 900 850 800 750 4L NT

1300 1200 1100 1000

5L TR 750 700 650 6L WB

MilliGain

850 800 7L ON

TIME (HOURS)

16 17 18 19 20 21

1100 1000 900

Gain amp vs UTC time for J1229+0203.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 10-JUN-2002 22:50:28

1L EB

1100 1000 900 800 2L JB 900 800 700 600 3L MC

1400 1200 1000 800 4L NT

1050 1000 950 900 850 5L TR 700 650 600 6L WB

MilliGain

1000 950 900 850 7L ON

1100

1000 900 8L CM

TIME (HOURS)

16 17 18 19 20 21

1100 1000 900 800

Gain amp vs UTC time for J1229+0203.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 10-JUN-2002 22:50:32

1L EB

1200 1100 1000 900 2L JB 900 800 700 600 3L MC

1400 1200 1000 800 4L NT

1100 1000 900 5L TR

1200 1000 800 600 6L WB

MilliGain

950 900 850 800 7L ON

1100

1000 900 8L CM

TIME (HOURS)

16 17 18 19 20 21 800 700

Gain amp vs UTC time for J1229+0203.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 10-JUN-2002 22:50:36

1L EB 1.4 1.2 1.0 0.8 2L JB 0.9 0.8 0.7 3L MC 0.9 0.8 0.7 4L NT 1.2 1.1 1.0 0.9 5L TR 4.0 3.8 3.6 3.4 3.2 6L WB

Gain

1.6 1.4 1.2 1.0 7L ON

TIME (HOURS)

16 17 18 19 20 21

1.10 1.05 1.00 0.95

Gain amp vs UTC time for J1232-0224.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 10-JUN-2002 22:59:53

1R EB 1.4 1.2 1.0 2R JB 1.5 1.4 1.3 1.2 3R MC

1.81.6 1.41.2 1.00.8

4R NT 2.0 1.5 1.0 5R TR 1.8 1.6 1.4 1.2 1.0 6R WB

Gain

1.0 0.9 0.8 7R ON 1.6 1.4 1.2 1.0 8R CM

TIME (HOURS)

16 17 18 19 20 21 22

14.775 14.770 14.765 14.760

Gain amp vs UTC time for J1232-0224.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 10-JUN-2002 22:59:57

1R EB 1.4 1.2 1.0 2R JB 1.2 1.1 1.0 3R MC 1.4 1.2 1.0 0.8 4R NT 1.0 0.9 0.8 5R TR 3 2 1 6R WB

Gain

1.1 1.0 0.9 0.8 7R ON 1.4 1.2 1.0 8R CM

TIME (HOURS)

16 17 18 19 20 21 22

5 4 3 2 1

Gain amp vs UTC time for J1232-0224.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 10-JUN-2002 23:00:01

1R EB 1.2 1.1 1.0 0.9 2R JB 1.8 1.6 1.4 1.2 1.0 3R MC 1.4 1.2 1.0 0.8 4R NT 150 100 50 0 6R WB

1.05 1.00 0.95 0.90 0.85

7R ON

Gain

2.0 1.5 1.0 8R CM

TIME (HOURS)

16 17 18 19 20 21 22

1.6 1.4 1.2 1.0 0.8

Gain amp vs UTC time for J1232-0224.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 10-JUN-2002 23:00:05

1R EB 1.4 1.2 1.0 2R JB 1.2 1.1 1.0 0.9 3R MC 1.0 0.9 0.8 0.7 4R NT 1.2 1.0 0.8 5R TR 1.6 1.4 1.2 1.0 0.8 0.6 6R WB

Gain

1.4 1.2 1.0 7R ON

TIME (HOURS)

16 17 18 19 20 21 22

1.8 1.6 1.4 1.2 1.0 0.8

Gain amp vs UTC time for J1232-0224.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 10-JUN-2002 23:00:17

1L EB 1.3 1.2 1.1 1.0 0.9 2L JB 1.2 1.1 1.0 0.9 3L MC 1.0 0.9 0.8 4L NT 1.1 1.0 0.9 0.8 5L TR 1.5 1.0 6L WB

Gain

1.1 1.0 0.9 0.8 7L ON 1.6 1.4 1.2 1.0 8L CM

TIME (HOURS)

16 17 18 19 20 21 22

1.0 0.9 0.8

Gain amp vs UTC time for J1232-0224.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 10-JUN-2002 23:00:21

1L EB 1.4 1.2 1.0 2L JB 1.1 1.0 0.9 3L MC 1.1 1.0 0.9 0.8 4L NT 1.0 0.9 0.8 5L TR 6 5 4 6L WB

Gain

1.3 1.2 1.1 1.0 7L ON

TIME (HOURS)

16 17 18 19 20 21 22

1.8 1.6 1.4 1.2 1.0 0.8