Center at RA 12 29 06.70000 DEC 02 03 08.6000

CONT: J1229+02 IPOL 4989.302 MHZ J1229+0203.ICL001.3

PLot file version 1 created 10-JUN-2002 22:52:32

Cont peak flux = 9.7537E+00 JY/BEAM Levs = 9.754E+00 * (-0.025, 0.025, 0.050, 0.099, 0.198, 0.396, 0.792)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100