Center at RA 08 54 48.87492 DEC 20 06 30.6409

CONT: 0851+202 IPOL 4988.365 MHZ 0851+202.ICL001.3

PLot file version 1 created 12-MAR-2003 11:23:24

Cont peak flux = 1.9108E+00 JY/BEAM Levs = 1.911E+00 * (-0.017, 0.017, 0.034, 0.068, 0.137, 0.274, 0.548)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100