Center at RA 13 31 08.28798 DEC 30 30 32.9589

CONT: 3C286 IPOL 1656.365 MHZ 3C286.IIM001.2

PLot file version 1 created 26-NOV-2003 11:44:09

Cont peak flux = 3.3903E+00 JY/BEAM Levs = 3.390E+00 * (-0.283, 0.283, 0.565)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250