Center at RA 11 18 57.30144 DEC 12 34 41.7181

CONT: J1118+12 IPOL 1656.365 MHZ J1118+1234.ICL001.3

PLot file version 1 created 26-NOV-2003 11:44:02

Cont peak flux = 1.4837E+00 JY/BEAM Levs = 1.484E+00 * (-0.006, 0.006, 0.012, 0.024, 0.048, 0.097, 0.194, 0.387, 0.775)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250