Center at RA 23 29 05.78678 DEC 08 34 15.8542

CONT: 2329+083 IPOL 1384.130 MHZ 2329+083.IIM001.1

PLot file version 1 created 29-JAN-2004 14:05:41

Cont peak flux = 2.2691E-01 JY/BEAM Levs = 2.269E-01 * (-0.322, 0.322, 0.644)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250