Gain amp vs UTC time for eb024d.TMP.1 CL 4 Rpol & Lpol IF 1

Plot file version 1 created 29-JAN-2004 14:07:28

1R EB

0.015

0.010

0.005

1L EB

0.014 0.012 0.010 0.008 0.006 0.004 2R MC

0.035 0.030 0.025 0.020 0.015

2L MC

0.035 0.030 0.025 0.020 0.015

3R WB 0.010 0.008 0.006

3L WB

Kilo Gain

0.012 0.010 0.008 0.006

4R ON

0.03

0.02

0.01

4L ON 0.03

0.02

0.01

5R TR 2.5 2.4 2.3 5L TR

TIME (HOURS)

02 04 06 08 10 12 14

2.85 2.80 2.75 2.70 2.65

Gain amp vs UTC time for eb024d.TMP.1 CL 4 Rpol & Lpol IF 1

Plot file version 2 created 29-JAN-2004 14:07:28

6R JB

0.020 0.015 0.010 0.005 6L JB

Kilo Gain

TIME (HOURS)

02 04 06 08 10 12 14

0.015 0.010 0.005