Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 1 created 29-JAN-2004 15:42:39

1R EB

1040 1020 1000 980 1L EB

1060 1040 1020 1000 980 2R MC

1050 1000 950 900 2L MC

1050 1000 950 900 3R WB 1020 1000 980 3L WB

MilliGain

1020

1000 980 4R ON

1100

1050

1000

4L ON

1060 1040 1020 1000 980 6R JB

1050 1000 950 900 6L JB

TIME (HOURS)

19 20 21 22 23 1/00 1/01 1/02 1/03

1300 1200 1100 1000 900