Center at RA 22 53 57.74793 DEC 16 08 53.5609

CONT: 3C454.3 IPOL 1415.303 MHZ 3C454.3.ICL001.5

PLot file version 1 created 25-MAY-2004 17:43:32

Cont peak flux = 1.2697E+01 JY/BEAM Levs = 1.270E+01 * (-0.010, 0.010, 0.020, 0.041, 0.082, 0.163, 0.326, 0.653)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250