Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 25-MAY-2004 17:40:46

1 JB IF 1R

0.99

0.98

0.97

1 JB IF 1L

0.98

0.97

0.96

1 JB IF 2R

0.99

0.98

0.97

1 JB IF 2L

1.165 1.160 1.155 1.150 1.145

1 JB IF 3R

0.95 0.94 0.93 0.92

1 JB IF 3L

Gain

0.980 0.978 0.976 0.974 0.972

1 JB IF 4R

0.955

0.950

0.945

1 JB IF 4L

0.970 0.965 0.960

2 CM IF 2R

0.805 0.800 0.795 0.790 0.785 2 CM IF 2L

TIME (HOURS)

17 28 29 30 31 32 33 34 35 36 37

0.785 0.780 0.775 0.770 0.765

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 25-MAY-2004 17:40:46

2 CM IF 3R

2.25

2.20

2.15 3 WB IF 1R

0.975 0.970 0.965 0.960 0.955

3 WB IF 1L

0.98

0.97

0.96 3 WB IF 2R

1.000 0.995 0.990 0.985

3 WB IF 2L

1.045 1.040 1.035 1.030 1.025 4 EF IF 1R

Gain

1.03

1.02

1.01 4 EF IF 1L

1.020 1.015 1.010 1.005

4 EF IF 2R

1.015 1.010 1.005 1.000 4 EF IF 2L

1.010

1.005

1.000 4 EF IF 3R

TIME (HOURS)

17 28 29 30 31 32 33 34 35 36 37

1.05

1.04

1.03

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 25-MAY-2004 17:40:46

4 EF IF 3L

1.025 1.020 1.015 1.010 1.005

4 EF IF 4R

1.02

1.01

1.00 4 EF IF 4L

1.006 1.004 1.002 1.000 0.998 5 ON IF 1R

1.06 1.04 1.02 1.00

5 ON IF 1L

1.00 0.98 0.96

5 ON IF 2R

Gain

1.06 1.04 1.02 1.00 5 ON IF 2L

1.12 1.10 1.08 1.06

5 ON IF 3R

0.89 0.88 0.87 0.86 0.85 5 ON IF 3L

1.02 1.00 0.98 0.96 5 ON IF 4R

TIME (HOURS)

17 28 29 30 31 32 33 34 35 36 37

1.04 1.02 1.00 0.98

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 25-MAY-2004 17:40:46

5 ON IF 4L

1.06 1.04 1.02

6 MC IF 1R

1.005 1.000 0.995 6 MC IF 1L

1.005 1.000

6 MC IF 2R

1.005 1.000 0.995 0.990 0.985 6 MC IF 2L

1.01 1.00 0.99

6 MC IF 3R

Gain

0.99 0.98 0.97 0.96

6 MC IF 3L

1.03 1.02 1.01

6 MC IF 4R

0.99 0.98 0.97

6 MC IF 4L

1.01 1.00 0.99

7 NT IF 1R

TIME (HOURS)

17 28 29 30 31 32 33 34 35 36 37

0.72 0.71 0.70

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 5 created 25-MAY-2004 17:40:46

7 NT IF 1L

0.75 0.74 0.73

7 NT IF 2R

0.735 0.730 0.725 0.720 0.715

7 NT IF 2L

0.73 0.72 0.71 0.70

7 NT IF 3R

0.73 0.72 0.71 0.70

7 NT IF 3L

0.74 0.73 0.72 0.71

7 NT IF 4R

Gain

0.86

0.84

0.82

7 NT IF 4L

0.74

0.72

0.70

8 TR IF 1R

0.090 0.085 0.080 0.075

8 TR IF 1L

0.055 0.050 0.045 0.040

8 TR IF 2R

TIME (HOURS)

17 28 29 30 31 32 33 34 35 36 37

0.095 0.090 0.085 0.080 0.075

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 6 created 25-MAY-2004 17:40:46

8 TR IF 2L

0.055 0.050 0.045 0.040

8 TR IF 3R

0.080 0.075 0.070 0.065

8 TR IF 3L

0.055 0.050 0.045 0.040

8 TR IF 4R

0.080 0.075 0.070 0.065

8 TR IF 4L

0.050 0.045 0.040 0.035

9 UR IF 1R

Gain

1.8 1.6 1.4 9 UR IF 1L

1.00

0.95

0.90

9 UR IF 2R

1.48 1.46 1.44 1.42 1.40

9 UR IF 2L

1.14 1.12 1.10 1.08 1.06

9 UR IF 3R

TIME (HOURS)

17 28 29 30 31 32 33 34 35 36 37

0.82

0.80

0.78

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 7 created 25-MAY-2004 17:40:46

9 UR IF 4R

1.10 1.05 1.00

9 UR IF 4L

Gain

TIME (HOURS)

17 28 29 30 31 32 33 34 35 36 37

1.15 1.10 1.05