Center at RA 01 32 44.12686 DEC 43 25 32.6610

CONT: J0132+43 IPOL 1415.303 MHZ J0132+4325.IIM001.2

PLot file version 1 created 25-MAY-2004 17:36:51

Cont peak flux = 2.3894E-01 JY/BEAM Levs = 2.389E-01 * (-0.091, 0.091, 0.181, 0.363, 0.726)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250