Center at RA 01 54 56.28988 DEC 47 43 26.5391

CONT: J0154+47 IPOL 1415.303 MHZ J0154+4743.ICL001.5

PLot file version 1 created 25-MAY-2004 17:43:20

Cont peak flux = 2.0226E-01 JY/BEAM Levs = 2.023E-01 * (-0.013, 0.013, 0.026, 0.052, 0.104, 0.209, 0.417, 0.834)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250