Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 30-JUN-2004 22:18:02

1 EF IF 1R

1030 1025 1020 1015

1 EF IF 1L

1005 1000 995 990 1 EF IF 2R

1030 1025 1020 1015

1 EF IF 2L

1005 1000 995 990 985 1 EF IF 3R

1030 1025 1020 1015

1 EF IF 3L

MilliGain

1020 1015 1010 1005

1 EF IF 4R

1030

1020

1010

1 EF IF 4L

1020 1015 1010 1005

1 EF IF 5L

1000 995 990 1 EF IF 6R

TIME (HOURS)

1/03 11 00 30 12 00 30 13 00 30 14 00 30 15 00

1030

1020

1010

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 30-JUN-2004 22:18:02

1 EF IF 6L 990 985 980 1 EF IF 7R 980 975 970 1 EF IF 7L 975 970 965 960 955 1 EF IF 8R 970 960 950 1 EF IF 8L 958 956 954 952 950 948 2 WB IF 1R

MilliGain

1035 1030 1025 1020 1015

2 WB IF 1L

1045 1040 1035 1030 1025

2 WB IF 2R

1035 1030 1025 1020 1015

2 WB IF 2L

1060 1055 1050 1045

2 WB IF 3R

TIME (HOURS)

1/03 11 00 30 12 00 30 13 00 30 14 00 30 15 00

1050

1040

1030

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 30-JUN-2004 22:18:02

2 WB IF 3L

1070 1065 1060 1055

2 WB IF 4R

1025

1020

1015

2 WB IF 4L

1030

1020

1010

2 WB IF 5L

1090 1080 1070 1060

2 WB IF 6R

1100 1080 1060

2 WB IF 6L

MilliGain

1120 1115 1110 1105

2 WB IF 7R 900 895 890 885 2 WB IF 7L 892 890 888 886 884 882 2 WB IF 8R 878 876 874 872 870 868 2 WB IF 8L

TIME (HOURS)

1/03 11 00 30 12 00 30 13 00 30 14 00 30 15 00

875 870 865

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 30-JUN-2004 22:18:02

3 JB IF 1R 945 940 935 3 JB IF 1L 980 970 960 3 JB IF 2R 945 940 935 3 JB IF 2L 975 970 965 960 955 3 JB IF 3R 925 920 915 910 3 JB IF 3L

MilliGain

1140 1130 1120

3 JB IF 4R 915 910 3 JB IF 4L

1195 1190 1185 1180

5 MC IF 1R 985 980 975 970 5 MC IF 1L

TIME (HOURS)

1/03 11 00 30 12 00 30 13 00 30 14 00 30 15 00

1015 1010 1005 1000 995

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 30-JUN-2004 22:18:02

5 MC IF 2R 990 980 970 5 MC IF 2L

1010

1000 990 5 MC IF 3R 990 980 970 5 MC IF 3L

1000 990 980 5 MC IF 4R 985 980 975 970 965 5 MC IF 4L

MilliGain

1000 990 980 5 MC IF 5L

1020

1015

1010

5 MC IF 6R 965 960 955 950 945 5 MC IF 6L

1010 1005 1000 995 5 MC IF 7R

TIME (HOURS)

1/03 11 00 30 12 00 30 13 00 30 14 00 30 15 00

1015 1010 1005

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 30-JUN-2004 22:18:02

5 MC IF 7L

1020 1018 1016 1014 1012

5 MC IF 8R

1004 1002 1000 998 996 994 5 MC IF 8L

1025

1020

1015

6 TR IF 1R

1040 1020 1000 980 6 TR IF 1L 960 940 920 900 6 TR IF 2R

MilliGain

1040 1020 1000 980 6 TR IF 2L 940 920 900 6 TR IF 3R

1120 1100 1080 1060 1040 1020

6 TR IF 3L 960 940 920 6 TR IF 4R

TIME (HOURS)

1/03 11 00 30 12 00 30 13 00 30 14 00 30 15 00

1100 1080 1060 1040 1020

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 7 created 30-JUN-2004 22:18:02

6 TR IF 4L 960 940 920 7 CM IF 4R 935 930 925 7 CM IF 4L

1010 1005 1000 995 8 NT IF 1R 870 865 860 8 NT IF 1L

1220 1210 1200 1190

8 NT IF 2R

MilliGain

870 860 850 8 NT IF 2L

1260 1250 1240 1230

8 NT IF 3R 900 890 880 8 NT IF 3L

1000 995 990 8 NT IF 4R

TIME (HOURS)

1/03 11 00 30 12 00 30 13 00 30 14 00 30 15 00

848 846 844 842 840

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 8 created 30-JUN-2004 22:18:02

8 NT IF 4L 975 970 965 960 955 8 NT IF 5L

1050 1040 1030 1020

8 NT IF 6R 895 890 8 NT IF 6L 985 980 975 8 NT IF 7R

1110

1100

1090

8 NT IF 7L

MilliGain

1365 1360 1355 1350

8 NT IF 8R

1130

1120

1110

8 NT IF 8L

TIME (HOURS)

1/03 11 00 30 12 00 30 13 00 30 14 00 30 15 00

1080 1075 1070 1065