Center at RA 13 37 49.64222 DEC 55 01 02.1179

CONT: J1337+55 IPOL 4990.021 MHZ J1337+550.ICL001.5

PLot file version 1 created 01-JUL-2004 10:57:28

Cont peak flux = 4.9717E-01 JY/BEAM Levs = 4.972E-01 * (-0.008, 0.008, 0.016, 0.032, 0.064, 0.128, 0.256, 0.511)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100