Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 01-JUL-2004 13:56:35

1 EF IF 1R

0.95 0.90 0.85 0.80 1 EF IF 1L

0.95 0.90 0.85 0.80 0.75 1 EF IF 2R 1.0 0.9 0.8 1 EF IF 2L 1.0 0.9 0.8 1 EF IF 3R 1.0 0.9 0.8 1 EF IF 3L

Gain

1.0 0.9 0.8 0.7 1 EF IF 4R 1.0 0.9 0.8 1 EF IF 4L 1.1 1.0 0.9 0.8 1 EF IF 5R

0.90

0.85

0.80 1 EF IF 6R

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

0.90

0.85

0.80

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 01-JUL-2004 13:56:35

1 EF IF 7R

0.945 0.940 0.935 0.930

1 EF IF 7L

0.915

0.910

0.905

1 EF IF 8R

0.95

0.94

0.93

2 WB IF 5R 1.1 1.0 0.9 0.8 0.7 2 WB IF 5L 1.1 1.0 0.9 0.8 0.7 2 WB IF 6R

Gain

1.1 1.0 0.9 0.8 0.7 2 WB IF 6L

1.16

1.14

1.12

2 WB IF 7R 1.6 1.4 1.2 1.0 0.8 2 WB IF 7L 1.8 1.6 1.4 1.2 1.0 2 WB IF 8R

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

1.8 1.6 1.4 1.2 1.0

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 01-JUL-2004 13:56:35

2 WB IF 8L 1.8 1.7 1.6 3 JB IF 1R

1.00 0.95

0.90

3 JB IF 1L

0.95 0.90 0.85 0.80 0.75

3 JB IF 2R

1.05 1.00 0.95 0.90

3 JB IF 2L 1.0 0.9 0.8 3 JB IF 3R

Gain

1.05 1.00 0.95 0.90

3 JB IF 3L 1.2 1.1 1.0 0.9 3 JB IF 4R

1.05 1.00 0.95 0.90 0.85

3 JB IF 4L 1.1 1.0 0.9 3 JB IF 5R

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

0.870 0.865 0.860 0.855

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 01-JUL-2004 13:56:35

3 JB IF 5L

0.86

0.84

0.82

3 JB IF 6R

0.905

0.900

0.895

3 JB IF 6L

0.88

0.86

0.84

3 JB IF 7R

0.870 0.865 0.860 0.855 3 JB IF 7L

0.95

0.90

0.85

3 JB IF 8R

Gain

1.048 1.046 1.044 1.042 1.040

3 JB IF 8L

0.710 0.705 0.700 0.695 4 ON IF 1R 1.6 1.4 1.2 1.0 0.8 4 ON IF 1L 1.1 1.0 0.9 0.8 4 ON IF 2R

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

1.6 1.4 1.2 1.0 0.8

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 01-JUL-2004 13:56:35

4 ON IF 2L 1.0 0.9 0.8 0.7 4 ON IF 3R 1.4 1.2 1.0 0.8 0.6 4 ON IF 3L

0.95 0.90 0.85 0.80 0.75

4 ON IF 4R 1.4 1.2 1.0 0.8 0.6 4 ON IF 4L 1.0 0.9 0.8 4 ON IF 5R

Gain

0.9 0.8 0.7 4 ON IF 5L 0.9 0.8 0.7 4 ON IF 6R 0.9 0.8 0.7 0.6 4 ON IF 6L 0.8 0.7 0.6 4 ON IF 7R

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

1.5 1.0 0.5

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 01-JUL-2004 13:56:35

4 ON IF 7L 0.9 0.8 0.7 0.6 4 ON IF 8R 0.8 0.7 0.6 0.5 4 ON IF 8L

0.80 0.75 0.70 0.65

5 MC IF 1R 1.6 1.4 1.2 1.0 0.8 0.6 5 MC IF 1L 1.0 0.8 0.6 5 MC IF 2R

Gain

1.4 1.2 1.0 0.8 0.6 5 MC IF 2L 1.0 0.8 0.6 5 MC IF 3R 2.0 1.5 1.0 0.5 5 MC IF 3L 1.4 1.2 1.0 0.8 0.6 5 MC IF 4R

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

1.2 1.0 0.8 0.6

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 7 created 01-JUL-2004 13:56:35

5 MC IF 4L 1.2 1.0 0.8 0.6 5 MC IF 5R 1.0 0.8 0.6 5 MC IF 5L 1.8 1.6 1.4 1.2 1.0 0.8 5 MC IF 6R 0.9 0.8 0.7 0.6 5 MC IF 6L

0.830 0.825 0.820 0.815

5 MC IF 7R

Gain

0.90 0.85 0.80 0.75

5 MC IF 7L 1.2 1.0 0.8 0.6 5 MC IF 8R

0.46

0.44

0.42

5 MC IF 8L 0.8 0.7 0.6 6 TR IF 1R

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

1.5 1.4 1.3 1.2 1.1

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 8 created 01-JUL-2004 13:56:35

6 TR IF 1L 1.0 0.9 0.8 6 TR IF 2R 1.5 1.4 1.3 1.2 1.1 6 TR IF 2L

0.86 0.84 0.82 0.80 0.78 0.76

6 TR IF 3R 1.6 1.4 1.2 6 TR IF 3L 1.2 1.0 0.8 6 TR IF 4R

Gain

1.6 1.4 1.2 6 TR IF 4L 1.2 1.0 0.8 6 TR IF 5L

1.70 1.65 1.60 1.55

6 TR IF 6R 3.1 3.0 2.9 6 TR IF 7L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

1.95 1.90 1.85 1.80 1.75

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 9 created 01-JUL-2004 13:56:35

6 TR IF 8R 3.1 3.0 2.9 2.8 6 TR IF 8L

1.66 1.64 1.62 1.60

7 NT IF 1R

0.38 0.36 0.34 0.32

7 NT IF 1L

0.56

0.54

0.52

7 NT IF 2R

0.50

0.45

0.40

7 NT IF 2L

Gain

0.70 0.68 0.66

7 NT IF 3R

0.60 0.55 0.50 0.45

7 NT IF 3L

0.66 0.64 0.62

7 NT IF 4R

0.70 0.65 0.60 0.55

7 NT IF 4L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

0.72 0.70 0.68 0.66

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 10 created 01-JUL-2004 13:56:35

7 NT IF 5L

0.82 0.80 0.78 0.76 0.74

7 NT IF 6R

0.80

0.75

0.70

7 NT IF 7R

0.86 0.84 0.82 0.80

7 NT IF 7L

0.90 0.88 0.86 0.84 0.82

7 NT IF 8R

0.92 0.90 0.88 0.86 0.84 0.82

7 NT IF 8L

Gain

0.90

0.89

0.88

8 RO IF 1L

1.55

1.50

8 RO IF 2L

4.395 4.390 4.385 4.380

8 RO IF 3L 7.0 6.5 6.0 8 RO IF 4L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

1.28 1.26 1.24 1.22 1.20 1.18

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 11 created 01-JUL-2004 13:56:35

8 RO IF 6L

Gain

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

3.65 3.60 3.55