Gain phs vs UTC time for J1310+322.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 01-JUL-2004 13:56:17

1 EF IF 1R 4 2 0 -2 1 EF IF 1L 4 2 0 -2 1 EF IF 2R 4 2 0 1 EF IF 2L 4 2 0 -2 1 EF IF 3R 4 2 0 -2 1 EF IF 3L

Degrees

2 0 -2 1 EF IF 4R 4 2 0 -2 1 EF IF 4L 4 2 0 -2 1 EF IF 5R

-44.995 -45.000 -45.005 -45.010 1 EF IF 6R

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

60.725 60.720 60.715 60.710

Gain phs vs UTC time for J1310+322.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 01-JUL-2004 13:56:17

1 EF IF 6L

-123.260 -123.265 -123.270 -123.275 1 EF IF 7R

131.555 131.550 131.545 131.540

1 EF IF 7L

-175.365 -175.370 -175.375 -175.380 1 EF IF 8R

122.590 122.585 122.580 122.575 2 WB IF 5R 350 300 250 200 150 2 WB IF 5L

Degrees

150 100 50 0 2 WB IF 6R 60 40 20 0 2 WB IF 6L 350 300 250 2 WB IF 7R 150 100 50 0 2 WB IF 7L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

200 100 0

Gain phs vs UTC time for J1310+322.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 01-JUL-2004 13:56:17

2 WB IF 8R 100 50 0 2 WB IF 8L 200 180 160 3 JB IF 1R

0.010 0.005 0.000 -0.005

3 JB IF 1L

0.010 0.005 0.000 -0.005

3 JB IF 2R

0.010 0.005 0.000 -0.005

3 JB IF 2L

0.010 0.005 0.000 -0.005

3 JB IF 3R

0.010 0.005 0.000 -0.005

3 JB IF 3L

0.010 0.005 0.000 -0.005

3 JB IF 4R

0.010 0.005 0.000 -0.005

3 JB IF 4L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for J1310+322.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 01-JUL-2004 13:56:17

3 JB IF 5R

0.010 0.005 0.000 -0.005

3 JB IF 5L

0.010 0.005 0.000 -0.005

3 JB IF 6R

0.010 0.005 0.000 -0.005

3 JB IF 6L

0.010 0.005 0.000 -0.005

3 JB IF 7R

0.010 0.005 0.000 -0.005

3 JB IF 7L

0.010 0.005 0.000 -0.005

3 JB IF 8R

0.010 0.005 0.000 -0.005

3 JB IF 8L

0.010 0.005 0.000 -0.005

4 ON IF 1R 5 0 -5 4 ON IF 1L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

5 0 -5

Gain phs vs UTC time for J1310+322.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 01-JUL-2004 13:56:17

4 ON IF 2R 5 0 -5 4 ON IF 2L 2 0 -2 -4 -6 -8 4 ON IF 3R 4 2 0 -2 -4 -6 4 ON IF 3L 5 0 -5 4 ON IF 4R 5 0 -5 4 ON IF 4L 0 -5 -10 4 ON IF 5R 0 -20 -40 4 ON IF 5L 350 300 250 200 150 4 ON IF 6R 80 60 40 20 0 4 ON IF 6L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

0 -50 -100

Gain phs vs UTC time for J1310+322.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 01-JUL-2004 13:56:17

4 ON IF 7R 150 100 50 0 4 ON IF 7L 0 -50 -100 -150

4 ON IF 8R 150 100 50 0 4 ON IF 8L 350 300 250 200 5 MC IF 1R 4 2 0 -2 5 MC IF 1L 8 6 4 2 0 5 MC IF 2R 4 2 0 -2 5 MC IF 2L 2 0 -2 5 MC IF 3R 4 2 0 5 MC IF 3L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

4 2 0

Gain phs vs UTC time for J1310+322.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 01-JUL-2004 13:56:17

5 MC IF 4R 4 2 0 5 MC IF 4L 6 4 2 5 MC IF 5R 350 300 250 200 150 5 MC IF 5L 150 100 50 0 5 MC IF 6R 60 40 20 0 5 MC IF 6L 0 -50 -100

5 MC IF 7R 150 100 50 0 5 MC IF 7L 350 300 250 200 5 MC IF 8R 100 50 0 5 MC IF 8L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

0 -50 -100 -150

Gain phs vs UTC time for J1310+322.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 8 created 01-JUL-2004 13:56:17

6 TR IF 1R 2 1 0 6 TR IF 1L 1.5 1.0 0.5 0.0 -0.5

6 TR IF 2R 1.5 1.0 0.5 0.0 6 TR IF 2L 1 0 -1 6 TR IF 3R 1.0 0.5 0.0 -0.5

6 TR IF 3L 1 0 -1 6 TR IF 4R 1 0 -1 6 TR IF 4L 2 0 -2 6 TR IF 5L

165.765 165.760 165.755 165.750

6 TR IF 6R

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

68 66 64 62 60

Gain phs vs UTC time for J1310+322.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 9 created 01-JUL-2004 13:56:17

6 TR IF 6L 235 230 225 6 TR IF 7L 180 178 176 6 TR IF 8R 130 125 120 6 TR IF 8L

-161.645 -161.650 -161.655 -161.660 7 NT IF 1R 8 6 4 2 0 7 NT IF 1L 8 6 4 2 7 NT IF 2R 0 -50 -100

7 NT IF 2L 5.0 4.5 4.0 3.5 7 NT IF 3R 10 5 7 NT IF 3L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

0 -5 -10

Gain phs vs UTC time for J1310+322.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 10 created 01-JUL-2004 13:56:17

7 NT IF 4R 5 0 -5 -10 -15 7 NT IF 4L 0 -20 -40 -60 7 NT IF 5L

165.315 165.310 165.305 165.300

7 NT IF 6R 70 65 60 7 NT IF 6L

-122 -124 -126 -128 -130

7 NT IF 7R 140 135 130 7 NT IF 7L 186 184 182 180 7 NT IF 8R 132 130 128 126 124 7 NT IF 8L

-157.690 -157.695 -157.700 -157.705 8 RO IF 1L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

4 2 0 -2 -4

Gain phs vs UTC time for J1310+322.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 11 created 01-JUL-2004 13:56:17

8 RO IF 2L 2 0 -2 8 RO IF 3L 2 0 -2 8 RO IF 4L 20 10 0 8 RO IF 6L

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

0 -50 -100