Center at RA 13 10 28.66385 DEC 32 20 43.7830

CONT: J1310+32 IPOL 1658.021 MHZ J1310+322.ICL001.5

PLot file version 1 created 01-JUL-2004 13:59:44

Cont peak flux = 5.3656E-01 JY/BEAM Levs = 5.366E-01 * (-0.068, 0.068, 0.137, 0.273, 0.546)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250