Center at RA 19 26 06.32170 DEC 50 52 57.0177

CONT: J1926+50 IPOL 4989.302 MHZ J1926+5052.IIM001.2

PLot file version 1 created 20-JUL-2004 21:33:43

Cont peak flux = 4.8158E-01 JY/BEAM Levs = 4.816E-01 * (-0.084, 0.084, 0.168, 0.337, 0.673)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100