Tsys vs UTC time for eb028a.MSORT.1 TY 1 Rpol & Lpol IF 1 - 4

Plot file version 15 created 20-JUL-2004 19:37:40

1 JB IF 1R 66 64 62 60 58 56 1 JB IF 1L 58 56 54 52 50 1 JB IF 2R 75 70 65 60 1 JB IF 2L 60 55 50 1 JB IF 3R 85 80 75 70 1 JB IF 3L

Kelvin

65 60 55 50 1 JB IF 4R 85 80 75 1 JB IF 4L 65 60 55 2 WB IF 1R 100 90 80 2 WB IF 1L

TIME (HOURS)

20 22 1/00 1/02 1/04 1/06 1/08

100 90 80

Tsys vs UTC time for eb028a.MSORT.1 TY 1 Rpol & Lpol IF 1 - 4

Plot file version 16 created 20-JUL-2004 19:37:40

2 WB IF 2R 100 90 80 2 WB IF 2L 100 90 80 2 WB IF 3R 110 100 90 80 70 2 WB IF 3L 110 100 90 80 70 2 WB IF 4R 110 100 90 80 70 2 WB IF 4L

Kelvin

110 100 90 80 70 3 EF IF 1R 50 40 30 3 EF IF 1L 45 40 35 30 3 EF IF 2R 50 40 30 3 EF IF 2L

TIME (HOURS)

20 22 1/00 1/02 1/04 1/06 1/08

45 40 35 30

Tsys vs UTC time for eb028a.MSORT.1 TY 1 Rpol & Lpol IF 1 - 4

Plot file version 17 created 20-JUL-2004 19:37:40

3 EF IF 3R 50 40 30 3 EF IF 3L 50 40 30 3 EF IF 4R 50 40 30 3 EF IF 4L 50 40 30 4 ON IF 1R 58 56 54 52 50 4 ON IF 1L

Kelvin

56 54 52 50 48 4 ON IF 2R 60 55 50 4 ON IF 2L 58 56 54 52 4 ON IF 3R 58 56 54 52 50 4 ON IF 3L

TIME (HOURS)

20 22 1/00 1/02 1/04 1/06 1/08

58 56 54 52 50 48

Tsys vs UTC time for eb028a.MSORT.1 TY 1 Rpol & Lpol IF 1 - 4

Plot file version 18 created 20-JUL-2004 19:37:40

4 ON IF 4R 58 56 54 52 50 48 4 ON IF 4L 60 55 50 5 MC IF 1R 50 45 40 5 MC IF 1L 55 50 45 5 MC IF 2R 50 45 40 5 MC IF 2L

Kelvin

55 50 45 5 MC IF 3R 50 45 40 5 MC IF 3L 50 45 5 MC IF 4R 50 45 5 MC IF 4L

TIME (HOURS)

20 22 1/00 1/02 1/04 1/06 1/08

55 50 45

Tsys vs UTC time for eb028a.MSORT.1 TY 1 Rpol & Lpol IF 1 - 4

Plot file version 19 created 20-JUL-2004 19:37:40

6 NT IF 1R 50 40 30 6 NT IF 1L 70 60 50 6 NT IF 2R 60 50 40 6 NT IF 2L 60 50 40 6 NT IF 3R 60 50 40 6 NT IF 3L

Kelvin

70 60 50 40 6 NT IF 4R 42 40 38 36 6 NT IF 4L 70 60 50 7 TR IF 1R 26 24 22 20 18 7 TR IF 1L

TIME (HOURS)

20 22 1/00 1/02 1/04 1/06 1/08

12 10 8

Tsys vs UTC time for eb028a.MSORT.1 TY 1 Rpol & Lpol IF 1 - 4

Plot file version 20 created 20-JUL-2004 19:37:40

7 TR IF 2R 20 18 16 7 TR IF 2L 12 11 10 9 7 TR IF 3R 16 14 12 7 TR IF 3L 12 10 8 7 TR IF 4R 13 12 11 10 9 7 TR IF 4L

Kelvin

11 10 9 8 8 SH IF 1L 120 115 110 105 8 SH IF 2L 112 110 108 106 104 102 8 SH IF 3L 120 115 110 8 SH IF 4L

TIME (HOURS)

20 22 1/00 1/02 1/04 1/06 1/08

135 130 125 120

Tsys vs UTC time for eb028a.MSORT.1 TY 1 Rpol & Lpol IF 1 - 4

Plot file version 21 created 20-JUL-2004 19:37:40

10 CM IF 1R

1.005 1.000 0.995

10 CM IF 1L

1.005 1.000 0.995

10 CM IF 2R

1.005 1.000 0.995

10 CM IF 2L

1.005 1.000 0.995

10 CM IF 3R

1.005 1.000 0.995

10 CM IF 3L

Kelvin

1.005 1.000 0.995

10 CM IF 4R

1.005 1.000 0.995

10 CM IF 4L

TIME (HOURS)

20 22 1/00 1/02 1/04 1/06 1/08

1.005 1.000 0.995