Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 03-DEC-2004 17:39:41

1 JB IF 1R

1.10 1.05 1.00 0.95

1 JB IF 1L

1.15

1.10

1.05

1 JB IF 2R 1.3 1.2 1.1 1.0 0.9 1 JB IF 2L

1.20 1.15 1.10

1 JB IF 3R 1.2 1.1 1.0 0.9 1 JB IF 3L

Gain

1.00 0.95 0.90

1 JB IF 4R

1.05 1.00 0.95 0.90

1 JB IF 4L

1.00 0.98 0.96 0.94 0.92

2 WB IF 2R 2.0 1.8 1.6 1.4 2 WB IF 3R

TIME (HOURS)

1/02 02 03 04 05 06 07 08 09 10 11

2.8 2.6 2.4

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 03-DEC-2004 17:39:41

2 WB IF 3L

7.185 7.180 7.175 7.170

2 WB IF 4R 3.5 3.0 2.5 2.0 3 EF IF 1R

0.98 0.96 0.94 0.92 0.90

3 EF IF 1L 1.0 0.8 0.6 3 EF IF 2R 1.0 0.9 0.8 3 EF IF 2L

Gain

0.990

0.985

0.980 3 EF IF 3R 1.0 0.9 0.8 3 EF IF 3L

1.04 1.02 1.00 0.98 0.96 0.94

3 EF IF 4R

1.02

1.00

0.98

0.96

3 EF IF 4L

TIME (HOURS)

1/02 02 03 04 05 06 07 08 09 10 11

0.984 0.982 0.980 0.978 0.976

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 03-DEC-2004 17:39:41

4 ON IF 1R

1.02 1.00 0.98 0.96 0.94 0.92 4 ON IF 1L 1.6 1.4 1.2 1.0 4 ON IF 2R 1.2 1.1 1.0 0.9 4 ON IF 2L

1.08

1.06

1.04 4 ON IF 3R 1.2 1.1 1.0 4 ON IF 3L

Gain

1.20

1.15

1.10

4 ON IF 4R

1.10 1.08 1.06

4 ON IF 4L

1.16

1.14

1.12

5 MC IF 1R

1.15 1.10 1.05 1.00 5 MC IF 1L

TIME (HOURS)

1/02 02 03 04 05 06 07 08 09 10 11

1.6 1.4 1.2 1.0

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 03-DEC-2004 17:39:41

5 MC IF 2R 1.3 1.2 1.1 1.0 0.9 5 MC IF 2L

0.96 0.94 0.92

5 MC IF 3R

1.15 1.10 1.05

5 MC IF 3L

1.04 1.02 1.00 0.98

5 MC IF 4R

1.02 1.00 0.98

5 MC IF 4L

Gain

0.99 0.98 0.97

7 TR IF 1R

0.47 0.46 0.45

7 TR IF 1L

0.60 0.55 0.50 0.45

7 TR IF 2R

0.54 0.52 0.50 0.48 0.46 0.44 7 TR IF 2L

TIME (HOURS)

1/02 02 03 04 05 06 07 08 09 10 11

0.40 0.39 0.38

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 5 created 03-DEC-2004 17:39:41

7 TR IF 3R

0.50

0.45

7 TR IF 3L

0.70 0.68 0.66 0.64 0.62

7 TR IF 4R

0.50 0.48 0.46 0.44 0.42

7 TR IF 4L

0.44 0.43 0.42

10 CM IF 3L

0.165 0.160 0.155 0.150

10 CM IF 4R

Gain

0.240 0.235 0.230 0.225

10 CM IF 4L

TIME (HOURS)

1/02 02 03 04 05 06 07 08 09 10 11

0.42 0.41 0.40 0.39