Gain phs vs UTC time for 3C286.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 1 created 03-DEC-2004 17:39:29

1 JB IF 1R 1 0 -1 -2 -3 1 JB IF 1L 2 0 -2 1 JB IF 2R 358 356 354 1 JB IF 2L 358 356 354 1 JB IF 3R 358 356 354 1 JB IF 3L

Degrees

-2 -4 -6 1 JB IF 4R 0 -2 -4 1 JB IF 4L 358 356 354 2 WB IF 1R 0 -5 -10 -15 2 WB IF 1L

TIME (HOURS)

1/02 02 03 04 05 06 07 08 09 10 11

0 -50 -100

Gain phs vs UTC time for 3C286.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 2 created 03-DEC-2004 17:39:29

2 WB IF 2R 10 0 -10 2 WB IF 3R 20 10 0 2 WB IF 3L

-5.980 -5.985 -5.990 -5.995

2 WB IF 4R 16 14 12 10 8 3 EF IF 1R

0.010 0.005 0.000 -0.005

3 EF IF 1L

Degrees

0.010 0.005 0.000 -0.005

3 EF IF 2R

0.010 0.005 0.000 -0.005

3 EF IF 2L

0.010 0.005 0.000 -0.005

3 EF IF 3R

0.010 0.005 0.000 -0.005

3 EF IF 3L

TIME (HOURS)

1/02 02 03 04 05 06 07 08 09 10 11

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 3C286.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 3 created 03-DEC-2004 17:39:29

3 EF IF 4R

0.010 0.005 0.000 -0.005

3 EF IF 4L

0.010 0.005 0.000 -0.005

4 ON IF 1R 5 0 -5 -10 -15 4 ON IF 1L 360 355 350 345 4 ON IF 2R 0 -5 -10 -15 4 ON IF 2L

Degrees

0 -10 -20 4 ON IF 3R 5 0 -5 -10 -15 4 ON IF 3L 5 0 -5 -10 -15 4 ON IF 4R 5 0 -5 -10 -15 4 ON IF 4L

TIME (HOURS)

1/02 02 03 04 05 06 07 08 09 10 11

5 0 -5 -10 -15

Gain phs vs UTC time for 3C286.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 4 created 03-DEC-2004 17:39:29

5 MC IF 1R 359 358 357 356 5 MC IF 1L 358 357 356 355 5 MC IF 2R 356 355 354 353 5 MC IF 2L -5 -6 -7 -8 5 MC IF 3R 358 356 354 5 MC IF 3L

Degrees

-4 -5 -6 -7 5 MC IF 4R 358 357 356 355 5 MC IF 4L -5 -6 -7 7 TR IF 1R 1.5 1.0 0.5 0.0 7 TR IF 1L

TIME (HOURS)

1/02 02 03 04 05 06 07 08 09 10 11

0.5 0.0 -0.5 -1.0

Gain phs vs UTC time for 3C286.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 5 created 03-DEC-2004 17:39:29

7 TR IF 2R 359 358 357 7 TR IF 2L 359 358 357 7 TR IF 3R 2 1 0 7 TR IF 3L 0.0 -0.5 -1.0

7 TR IF 4R 3.0 2.5 2.0 1.5 7 TR IF 4L

Degrees

2 0 -2 10 CM IF 2R 264 262 260 258 10 CM IF 2L

-122.040 -122.045 -122.050 -122.055 10 CM IF 3R 50 45 40 10 CM IF 3L

TIME (HOURS)

1/02 02 03 04 05 06 07 08 09 10 11

48 46 44 42

Gain phs vs UTC time for 3C286.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 6 created 03-DEC-2004 17:39:29

10 CM IF 4R -98 -100 -102 -104 -106 -108

10 CM IF 4L 6 4 2 0 -2 11 RO IF 1L

Degrees

TIME (HOURS)

1/02 02 03 04 05 06 07 08 09 10 11

300 250 200