Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 03-DEC-2004 17:35:41

1 JB IF 1R

1.05 1.00 0.95 0.90 0.85 1 JB IF 1L 1.1 1.0 0.9 1 JB IF 2R 1.0 0.9 0.8 1 JB IF 2L 1.2 1.1 1.0 0.9 1 JB IF 3R 1.0 0.9 0.8 1 JB IF 3L

Gain

1.0 0.9 0.8 1 JB IF 4R 1.0 0.9 0.8 1 JB IF 4L 1.0 0.9 0.8 2 WB IF 1R

0.975 0.970 0.965 2 WB IF 1L

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03

0.98 0.97 0.96

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 03-DEC-2004 17:35:41

2 WB IF 2R

1.03

1.02

1.01

2 WB IF 2L

1.030 1.025 1.020 1.015

2 WB IF 3R

1.005 1.000 0.995 0.990 0.985 2 WB IF 3L

1.01

1.00

0.99

2 WB IF 4R

1.01

1.00

0.99

2 WB IF 4L

Gain

1.01

1.00

0.99

3 EF IF 1R

1.035 1.030 1.025 1.020 1.015 3 EF IF 1L

1.02

1.01

1.00

3 EF IF 2R

1.030 1.025 1.020 1.015

3 EF IF 2L

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03

1.008 1.006 1.004 1.002 1.000

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 03-DEC-2004 17:35:41

3 EF IF 3R

1.032 1.030 1.028 1.026 1.024 1.022 3 EF IF 3L

1.028 1.026 1.024 1.022 1.020 1.018 3 EF IF 4R

1.020 1.015 1.010 3 EF IF 4L

1.025

1.020

1.015 4 ON IF 1R

0.90

0.85

4 ON IF 1L

Gain

1.02 1.00 0.98 0.96

4 ON IF 2R

0.95

0.90

0.85 4 ON IF 2L

1.05 1.00 0.95 0.90 4 ON IF 3R

1.00 0.95 0.90 0.85 4 ON IF 3L

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03

1.15 1.10 1.05 1.00

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 03-DEC-2004 17:35:41

4 ON IF 4R

1.05 1.00 0.95 0.90 0.85

4 ON IF 4L

1.10 1.05 1.00 0.95

5 MC IF 1R

1.04 1.03 1.02 1.01

5 MC IF 1L

0.940

0.935

5 MC IF 2R

0.99 0.98 0.97 0.96

5 MC IF 2L

Gain

0.915 0.910 0.905 0.900

5 MC IF 3R

0.94 0.93 0.92 0.91

5 MC IF 3L

0.92

0.91

0.90

5 MC IF 4R

0.93

0.92

0.91

5 MC IF 4L

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03

0.91

0.90

0.89

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 5 created 03-DEC-2004 17:35:41

6 NT IF 1R

13.290 13.285 13.280 13.275

6 NT IF 1L

5.385 5.380 5.375 5.370

6 NT IF 2R

3.495 3.490 3.485 3.480

6 NT IF 2L

3.595 3.590 3.585 3.580

6 NT IF 3R 3.4 3.2 3.0 6 NT IF 3L

Gain

3.345 3.340 3.335 3.330

6 NT IF 4R 3.5 3.0 2.5 2.0 6 NT IF 4L

2.685 2.680 2.675 2.670

7 TR IF 1R

0.50 0.45 0.40

7 TR IF 1L

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03

0.50 0.45 0.40 0.35

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 6 created 03-DEC-2004 17:35:41

7 TR IF 2R

0.55

0.50

0.45

7 TR IF 2L

0.46 0.44 0.42 0.40 0.38

7 TR IF 3R

0.50

0.45

7 TR IF 3L

0.75 0.70 0.65 0.60

7 TR IF 4R

0.50

0.45

0.40

7 TR IF 4L

Gain

0.50

0.45

0.40

8 SH IF 1R 1.7 1.6 1.5 1.4 8 SH IF 1L 2.6 2.4 2.2 2.0 1.8 8 SH IF 2R 2.0 1.8 1.6 1.4 8 SH IF 2L

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03

2.0 1.8 1.6 1.4 1.2

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 7 created 03-DEC-2004 17:35:41

8 SH IF 3R 1.6 1.4 1.2 8 SH IF 3L 1.5 1.4 1.3 1.2 8 SH IF 4R 1.2 1.1 1.0 8 SH IF 4L 1.3 1.2 1.1 9 UR IF 1R 1.2 1.0 0.8 9 UR IF 2R

Gain

1.1 1.0 0.9 0.8 0.7 9 UR IF 2L 1.6 1.4 1.2 1.0 9 UR IF 3R 1.2 1.0 0.8 9 UR IF 3L 1.4 1.2 1.0 9 UR IF 4R

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03

1.2 1.0 0.8

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 8 created 03-DEC-2004 17:35:41

9 UR IF 4L 1.4 1.2 1.0 0.8 10 CM IF 2R

0.80 0.75 0.70 0.65

10 CM IF 2L

0.90 0.85 0.80 0.75

10 CM IF 3R

0.90 0.85 0.80

10 CM IF 3L

0.95 0.90 0.85 0.80

10 CM IF 4R

Gain

1.3 1.2 1.1 1.0 0.9 10 CM IF 4L 2.6 2.4 2.2 11 RO IF 1L

11.0

10.5

11 RO IF 2L

6.885 6.880 6.875 6.870

11 RO IF 3L

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03

5.535 5.530 5.525 5.520

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 9 created 03-DEC-2004 17:35:41

11 RO IF 4L

Gain

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03

17.090 17.085 17.080 17.075