Gain phs vs UTC time for J1640+3946.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 1 created 03-DEC-2004 17:36:30

1 JB IF 1R 0.2 0.0 -0.2 -0.4

1 JB IF 1L 1.0 0.5 0.0 1 JB IF 2R 0.5 0.0 -0.5 -1.0

1 JB IF 2L

-0.5

-1.0

-1.5

1 JB IF 3R 1.5 1.0 0.5 0.0 -0.5

1 JB IF 3L

Degrees

1.5 1.0 0.5 0.0 1 JB IF 4R 1.0 0.5 0.0 1 JB IF 4L 1.0 0.5 0.0 2 WB IF 1R 1 0 -1 -2 2 WB IF 1L

TIME (HOURS)

1/02 33 34 35 36 37 38 39 40 41 42

1 0 -1 -2

Gain phs vs UTC time for J1640+3946.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 2 created 03-DEC-2004 17:36:30

2 WB IF 2R 1 0 -1 -2 -3 2 WB IF 2L 1 0 -1 -2 -3 2 WB IF 3R 1 0 -1 -2 2 WB IF 3L 2 0 -2 2 WB IF 4R 2 1 0 -1 2 WB IF 4L

Degrees

2 1 0 -1 3 EF IF 1R

0.010 0.005 0.000 -0.005

3 EF IF 1L

0.010 0.005 0.000 -0.005

3 EF IF 2R

0.010 0.005 0.000 -0.005

3 EF IF 2L

TIME (HOURS)

1/02 33 34 35 36 37 38 39 40 41 42

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for J1640+3946.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 3 created 03-DEC-2004 17:36:30

3 EF IF 3R

0.010 0.005 0.000 -0.005

3 EF IF 3L

0.010 0.005 0.000 -0.005

3 EF IF 4R

0.010 0.005 0.000 -0.005

3 EF IF 4L

0.010 0.005 0.000 -0.005

4 ON IF 1R 2 1 0 -1 4 ON IF 1L

Degrees

3 2 1 0 -1 4 ON IF 2R 1 0 -1 -2 4 ON IF 2L 1 0 -1 -2 4 ON IF 3R 2 1 0 -1 4 ON IF 3L

TIME (HOURS)

1/02 33 34 35 36 37 38 39 40 41 42

2 1 0 -1

Gain phs vs UTC time for J1640+3946.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 4 created 03-DEC-2004 17:36:30

4 ON IF 4R 2 0 -2 4 ON IF 4L 2 1 0 5 MC IF 1R 2 0 -2 5 MC IF 1L 1 0 -1 -2 -3 5 MC IF 2R 1 0 -1 -2 -3 5 MC IF 2L

Degrees

0 -2 -4 5 MC IF 3R 3 2 1 0 5 MC IF 3L 3 2 1 0 5 MC IF 4R 3 2 1 0 5 MC IF 4L

TIME (HOURS)

1/02 33 34 35 36 37 38 39 40 41 42

3 2 1 0 -1

Gain phs vs UTC time for J1640+3946.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 5 created 03-DEC-2004 17:36:30

6 NT IF 1R

150.400 150.395 150.390 150.385

6 NT IF 1L

144.370 144.365 144.360 144.355

6 NT IF 2R

-58.290 -58.295 -58.300 -58.305

6 NT IF 2L 100 50 0 -50 6 NT IF 3R 61 60 59 58 57 6 NT IF 3L

Degrees

120 100 80 60 40 20 6 NT IF 4R 0 -50 -100

6 NT IF 4L 0 -100

-200

7 TR IF 1R 3 2 1 0 7 TR IF 1L

TIME (HOURS)

1/02 33 34 35 36 37 38 39 40 41 42

1.0 0.8 0.6 0.4 0.2

Gain phs vs UTC time for J1640+3946.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 6 created 03-DEC-2004 17:36:30

7 TR IF 2R 1 0 -1 -2 7 TR IF 2L 1.5 1.0 0.5 0.0 -0.5

7 TR IF 3R 2 0 -2 7 TR IF 3L 3 2 1 7 TR IF 4R 0.8 0.6 0.4 0.2 0.0 7 TR IF 4L

Degrees

2 1 0 10 CM IF 2R

-144 -146 -148 -150

10 CM IF 2L

-166 -168 -170 -172 -174 -176

10 CM IF 3R 4.5 4.0 3.5 3.0 2.5 10 CM IF 3L

TIME (HOURS)

1/02 33 34 35 36 37 38 39 40 41 42

5 4 3

Gain phs vs UTC time for J1640+3946.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 7 created 03-DEC-2004 17:36:30

10 CM IF 4R

-120 -130 -140 -150

10 CM IF 4L -10 -12 -14 -16 -18 11 RO IF 2L

-26.180 -26.185 -26.190 -26.195

11 RO IF 3L 150 100 50 0 11 RO IF 4L

Degrees

TIME (HOURS)

1/02 33 34 35 36 37 38 39 40 41 42

-18.895 -18.900 -18.905 -18.910