Center at RA 16 40 29.63277 DEC 39 46 46.0285

CONT: J1640+39 IPOL 1652.803 MHZ J1640+3946.ICL001.5

PLot file version 1 created 03-DEC-2004 17:45:31

Cont peak flux = 1.1806E+00 JY/BEAM Levs = 1.181E+00 * (-0.024, 0.024, 0.049, 0.097, 0.194, 0.389, 0.777)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250