Center at RA 19 26 06.32170 DEC 50 52 57.0177

CONT: J1926+50 IPOL 1652.803 MHZ J1926+5052.ICL001.5

PLot file version 1 created 03-DEC-2004 17:41:49

Cont peak flux = 3.4937E-01 JY/BEAM Levs = 3.494E-01 * (-0.003, 0.003, 0.007, 0.013, 0.026, 0.052, 0.105, 0.209, 0.418, 0.837)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250