Gain amp vs UTC time for 1949+023.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 05-NOV-2004 10:52:55

1 JB IF 2L

0.665 0.660 0.655 0.650

1 JB IF 3R

4.705 4.700 4.695 4.690

1 JB IF 4R

0.330 0.325 0.320 0.315 2 WB IF 1R

1.05 1.00 0.95 0.90 0.85

2 WB IF 1L

1.05 1.00 0.95 0.90 0.85

2 WB IF 2R

Gain

1.1 1.0 0.9 2 WB IF 2L 1.1 1.0 0.9 0.8 2 WB IF 3R 1.1 1.0 0.9 2 WB IF 3L

1.00 0.95 0.90

2 WB IF 4R

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07 1/08 1/09

1.1 1.0 0.9

Gain amp vs UTC time for 1949+023.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 05-NOV-2004 10:52:55

2 WB IF 4L 2.0 1.5 1.0 3 EF IF 1R

1.00 0.95 0.90

3 EF IF 1L

1.05 1.00 0.95 0.90 0.85

3 EF IF 2R

1.02 1.00 0.98 0.96 0.94 0.92

3 EF IF 2L 1.4 1.2 1.0 3 EF IF 3R

Gain

1.2 1.1 1.0 0.9 3 EF IF 3L 1.2 1.0 0.8 3 EF IF 4R 1.6 1.4 1.2 1.0 0.8 3 EF IF 4L 1.4 1.2 1.0 4 ON IF 1L

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07 1/08 1/09

1.450 1.445 1.440 1.435

Gain amp vs UTC time for 1949+023.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 05-NOV-2004 10:52:55

4 ON IF 2R

8.565 8.560 8.555 8.550

4 ON IF 4L

0.915 0.910 0.905 0.900 5 MC IF 1L 2.0 1.5 1.0 5 MC IF 3L

0.925 0.920 0.915 0.910 5 MC IF 4L 1.6 1.4 1.2 1.0 6 TR IF 1R

Gain

1.140 1.135 1.130 1.125

6 TR IF 2R

0.255 0.250 0.245 0.240 6 TR IF 3L

0.455 0.450 0.445 0.440 6 TR IF 4R 1.0 0.8 0.6 7 SH IF 3L

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07 1/08 1/09

0.995 0.990 0.985 0.980

Gain amp vs UTC time for 1949+023.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 05-NOV-2004 10:52:55

7 SH IF 4L

0.410 0.405 0.400 0.395

9 NT IF 2L

2.380 2.375 2.370 2.365 9 NT IF 3R 1.2 1.0 0.8 0.6 0.4 0.2 9 NT IF 3L

0.815 0.810 0.805 0.800 10 HH IF 1L 2.0 1.5 1.0 0.5 10 HH IF 2L

Gain

1.455 1.450 1.445 1.440 10 HH IF 3R

0.055 0.050 0.045 0.040 10 HH IF 4R

0.510 0.505 0.500 0.495

10 HH IF 4L

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07 1/08 1/09

0.590 0.585 0.580 0.575