Gain phs vs UTC time for 1949+023.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 1 created 05-NOV-2004 10:52:36

1 JB IF 1L 250 200 150 1 JB IF 2L 110 100 90 80 70 1 JB IF 3R

-99.570 -99.575 -99.580 -99.585

1 JB IF 3L

-162.015 -162.020 -162.025 -162.030 1 JB IF 4R 300 280 260 240 220 1 JB IF 4L

Degrees

161.440 161.435 161.430 161.425 2 WB IF 1R 100 50 0 2 WB IF 1L 0 -20 -40 2 WB IF 2R 10 0 -10 -20 2 WB IF 2L

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07 1/08 1/09

0 -20 -40

Gain phs vs UTC time for 1949+023.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 2 created 05-NOV-2004 10:52:36

2 WB IF 3R 40 20 0 2 WB IF 3L 0 -50 -100 2 WB IF 4R 0 -50 -100 2 WB IF 4L 40 20 0 3 EF IF 1R

0.010 0.005 0.000 -0.005

3 EF IF 1L

Degrees

0.010 0.005 0.000 -0.005

3 EF IF 2R

0.010 0.005 0.000 -0.005

3 EF IF 2L

0.010 0.005 0.000 -0.005

3 EF IF 3R

0.010 0.005 0.000 -0.005

3 EF IF 3L

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07 1/08 1/09

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 1949+023.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 3 created 05-NOV-2004 10:52:36

3 EF IF 4R

0.010 0.005 0.000 -0.005

3 EF IF 4L

0.010 0.005 0.000 -0.005

4 ON IF 1R

30.230 30.225 30.220 30.215

4 ON IF 1L 120 100 80 60 40 20 4 ON IF 2R 250 200 150 100 50 4 ON IF 2L

Degrees

160 140 120 100 80 60 4 ON IF 3R 340 320 300 280 260 4 ON IF 3L 50 0 -50 4 ON IF 4R 40 20 0 4 ON IF 4L

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07 1/08 1/09

50 0 -50 -100 -150

Gain phs vs UTC time for 1949+023.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 4 created 05-NOV-2004 10:52:36

5 MC IF 1R 50 0 -50 -100

5 MC IF 1L 100 50 0 -50 5 MC IF 2R 200 150 100 50 5 MC IF 2L 0 -50 -100 5 MC IF 3R 100 0 -100

5 MC IF 3L

Degrees

50 0 -50 -100

5 MC IF 4R 150 100 50 0 -50 5 MC IF 4L 100 0 -100

6 TR IF 1R 150 100 50 0 6 TR IF 1L

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07 1/08 1/09

250 200 150 100 50

Gain phs vs UTC time for 1949+023.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 5 created 05-NOV-2004 10:52:36

6 TR IF 2R 50 0 -50 -100 -150

6 TR IF 2L 120 100 80 60 6 TR IF 3R 140 120 100 6 TR IF 3L 100 50 0 -50 6 TR IF 4R 110 100 90 6 TR IF 4L

Degrees

250 200 150 7 SH IF 1L

104.095 104.090 104.085 104.080

7 SH IF 2L

10.640 10.635 10.630 10.625

7 SH IF 3L 0 -20 -40 7 SH IF 4L

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07 1/08 1/09

50 40 30 20

Gain phs vs UTC time for 1949+023.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 6 created 05-NOV-2004 10:52:36

9 NT IF 1R

-152.485 -152.490 -152.495 -152.500

9 NT IF 1L 100 50 0 -50 9 NT IF 2R

44.985 44.980 44.975 44.970

9 NT IF 2L 0 -20 -40 9 NT IF 3R 250 200 150 100 50 9 NT IF 3L

Degrees

45 40 35 30 9 NT IF 4R 300 250 200 150 9 NT IF 4L 100 50 0 -50 10 HH IF 1R

151.720 151.715 151.710 151.705

10 HH IF 1L

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07 1/08 1/09

250 200 150

Gain phs vs UTC time for 1949+023.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 7 created 05-NOV-2004 10:52:36

10 HH IF 2R 200 100 0 10 HH IF 2L

15.105 15.100 15.095 15.090

10 HH IF 3R

-78.420 -78.425 -78.430 -78.435

10 HH IF 4R 280 260 240 10 HH IF 4L

Degrees

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07 1/08 1/09

150 100 50