Center at RA 19 49 07.54000 DEC 02 37 01.9000

CONT: 1949+023 IPOL 4989.443 MHZ 1949+023.IIM001.2

PLot file version 1 created 05-NOV-2004 10:51:14

Cont peak flux = -4.1056E-02 JY/BEAM Levs = 2.323E-02 * (-0.365, 0.365, 0.730)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100