Center at RA 19 38 30.66962 DEC 04 48 11.6117

CONT: J1938+04 IPOL 4989.443 MHZ J1938+0448.ICL001.5

PLot file version 1 created 05-NOV-2004 10:55:58

Cont peak flux = 7.3025E-01 JY/BEAM Levs = 7.303E-01 * (-0.021, 0.021, 0.042, 0.084, 0.169, 0.338, 0.675)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100