Center at RA 03 13 57.64600 DEC 41 15 23.9700

CONT: 0313+411 IPOL 1656.365 MHZ 0313+4115.ICL001.6

PLot file version 1 created 30-DEC-2005 08:47:45

Cont peak flux = 4.1694E-02 JY/BEAM Levs = 4.169E-02 * (-0.006, 0.006, 0.012, 0.025, 0.050, 0.099, 0.198, 0.396, 0.793)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250