Center at RA 08 47 12.92900 DEC 11 33 50.1600

CONT: 0847+113 IPOL 1656.365 MHZ 0847+1133.IIM001.2

PLot file version 1 created 30-DEC-2005 06:01:40

Cont peak flux = 2.9255E-03 JY/BEAM Levs = 2.925E-03 * (-0.331, 0.331, 0.663)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250