Center at RA 09 16 51.93400 DEC 52 38 28.3700

CONT: 0916+523 IPOL 1656.365 MHZ 0916+5238.IIM001.2

PLot file version 1 created 30-DEC-2005 06:01:42

Cont peak flux = 1.5287E-02 JY/BEAM Levs = 1.529E-02 * (-0.238, 0.238, 0.475, 0.951)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250