Center at RA 12 31 43.57100 DEC 28 47 49.7800

CONT: 1231+284 IPOL 1656.365 MHZ 1231+2848.ICL001.6

PLot file version 1 created 30-DEC-2005 08:50:31

Cont peak flux = 4.2097E-02 JY/BEAM Levs = 4.210E-02 * (-0.031, 0.031, 0.063, 0.126, 0.251, 0.502)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250