Center at RA 15 39 09.66600 DEC -06 58 43.1900

CONT: 1539-065 IPOL 1656.365 MHZ 1539-0658.ICL001.6

PLot file version 1 created 30-DEC-2005 08:51:40

Cont peak flux = 4.5688E-02 JY/BEAM Levs = 4.569E-02 * (-0.030, 0.030, 0.060, 0.121, 0.241, 0.483, 0.965)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250