Gain amp vs UTC time for 1744-0518.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 30-DEC-2005 08:41:11

1 JB IF 1R 2.0 1.5 1.0 0.5 1 JB IF 1L 1.5 1.0 0.5 1 JB IF 2R 2.5 2.0 1.5 1.0 0.5 1 JB IF 2L 1.5 1.0 0.5 2 WB IF 1R 3 2 1 2 WB IF 1L

Gain

2 1 0 2 WB IF 2R 1.2 1.0 0.8 0.6 0.4 0.2 2 WB IF 2L 1.5 1.0 0.5 3 EF IF 1R 1.5 1.0 0.5 3 EF IF 1L

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03 1/04

1.5 1.0 0.5

Gain amp vs UTC time for 1744-0518.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 30-DEC-2005 08:41:11

3 EF IF 2R 1.5 1.0 0.5 3 EF IF 2L 1.5 1.0 0.5 4 ON IF 1R 2 1 0 4 ON IF 1L

0.040 0.035 0.030 0.025

4 ON IF 2R

0.750 0.745 0.740 0.735

4 ON IF 2L

Gain

0.6 0.4 0.2 5 MC IF 1R

0.25 0.24 0.23

5 MC IF 1L 0.8 0.6 0.4 0.2 5 MC IF 2R 0.7 0.6 0.5 0.4 5 MC IF 2L

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03 1/04

2.0 1.5 1.0 0.5

Gain amp vs UTC time for 1744-0518.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 3 created 30-DEC-2005 08:41:11

6 TR IF 1R 0.8 0.6 0.4 6 TR IF 1L

0.30

0.25

0.20

6 TR IF 2R 2.0 1.5 1.0 6 TR IF 2L 1.4 1.2 1.0 0.8 0.6 0.4 7 SH IF 1L

0.955 0.950 0.945 0.940 7 SH IF 2L

Gain

0.205 0.200 0.195 0.190

8 UR IF 1R 1.4 1.2 1.0 0.8 0.6 0.4 8 UR IF 1L

0.585 0.580 0.575 0.570 8 UR IF 2R 1.6 1.4 1.2 1.0 0.8 8 UR IF 2L

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03 1/04

0.6 0.5 0.4

Gain amp vs UTC time for 1744-0518.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 4 created 30-DEC-2005 08:41:11

9 CM IF 1R

0.45

0.44

0.43

9 CM IF 1L 0.7 0.6 0.5 0.4 9 CM IF 2R 0.6 0.5 0.4 0.3 9 CM IF 2L 1.5 1.0 0.5 10 NT IF 1R

0.35 0.30 0.25 0.20

10 NT IF 1L

Gain

2.0 1.5 1.0 0.5 10 NT IF 2R

0.55 0.50 0.45 0.40 0.35

10 NT IF 2L

0.615 0.610 0.605 0.600

11 HH IF 1R 0.6 0.5 0.4 11 HH IF 1L

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03 1/04

1.5 1.0 0.5

Gain amp vs UTC time for 1744-0518.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 5 created 30-DEC-2005 08:41:11

11 HH IF 2R

0.400 0.395 0.390 0.385

11 HH IF 2L

Gain

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03 1/04

0.8 0.6 0.4 0.2