Gain phs vs UTC time for 1744-0518.MULTI.1 SN 3 Rpol & Lpol IF 1 - 2

Plot file version 1 created 30-DEC-2005 08:42:32

1 JB IF 1R 100 0 -100

1 JB IF 1L 40 20 0 -20 -40 1 JB IF 2R 100 0 -100 -200 1 JB IF 2L 100 0 -100

2 WB IF 1R 200 100 0 -100

2 WB IF 1L

Degrees

100 0 -100

2 WB IF 2R 100 50 0 -50 2 WB IF 2L 50 0 -50 3 EF IF 1R

0.010 0.005 0.000 -0.005

3 EF IF 1L

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03 1/04

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 1744-0518.MULTI.1 SN 3 Rpol & Lpol IF 1 - 2

Plot file version 2 created 30-DEC-2005 08:42:32

3 EF IF 2R

0.010 0.005 0.000 -0.005

3 EF IF 2L

0.010 0.005 0.000 -0.005

4 ON IF 1R 50 0 -50 -100 4 ON IF 2R

-6.790 -6.795 -6.800 -6.805 4 ON IF 2L 80 60 40 20 0 -20 5 MC IF 1R

Degrees

82 80 78 76 5 MC IF 1L 0 -20 -40 5 MC IF 2R 100 0 -100 5 MC IF 2L 20 0 -20 -40 6 TR IF 1R

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03 1/04

50 40 30

Gain phs vs UTC time for 1744-0518.MULTI.1 SN 3 Rpol & Lpol IF 1 - 2

Plot file version 3 created 30-DEC-2005 08:42:32

6 TR IF 1L 100 50 0 6 TR IF 2R 100 0 -100 6 TR IF 2L 350 300 250 200 8 UR IF 1R 100 0 -100 8 UR IF 1L 20 0 -20 8 UR IF 2R

Degrees

80 60 40 20 0 8 UR IF 2L

-32.0 -32.5 -33.0 9 CM IF 1L 80 60 40 9 CM IF 2R 60 40 20 0 9 CM IF 2L

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03 1/04

100 0 -100

Gain phs vs UTC time for 1744-0518.MULTI.1 SN 3 Rpol & Lpol IF 1 - 2

Plot file version 4 created 30-DEC-2005 08:42:32

10 NT IF 1R

26.185 26.180 26.175 26.170 10 NT IF 1L 100 0 -100 -200

10 NT IF 2R 50 0 -50 11 HH IF 1L 100 0 -100

11 HH IF 2L

Degrees

TIME (HOURS)

20 21 22 23 1/00 1/01 1/02 1/03 1/04

-21.745 -21.750 -21.755 -21.760