Center at RA 17 44 20.87100 DEC -05 18 40.2200

CONT: 1744-051 IPOL 1656.365 MHZ 1744-0518.ICL001.6

PLot file version 1 created 30-DEC-2005 08:53:53

Cont peak flux = 2.5222E-03 JY/BEAM Levs = 2.522E-03 * (-0.269, 0.269, 0.538)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250