Center at RA 18 13 35.20300 DEC 31 44 17.6100

CONT: 1813+314 IPOL 1656.365 MHZ 1813+3144.IIM001.1

PLot file version 1 created 30-DEC-2005 06:01:23

Cont peak flux = 5.3924E-02 JY/BEAM Levs = 5.392E-02 * (-0.390, 0.390, 0.780)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250