Center at RA 12 56 11.16656 DEC -05 47 21.5247

CONT: 3C279 IPOL 1656.365 MHZ 3C279.ICL001.6

PLot file version 1 created 30-DEC-2005 11:41:24

Cont peak flux = 7.7150E+00 JY/BEAM Levs = 7.715E+00 * (-0.007, 0.007, 0.015, 0.030, 0.059, 0.119, 0.238, 0.475, 0.951)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250