Center at RA 11 45 38.51868 DEC 44 20 21.9133

CONT: J1145+44 IPOL 1656.365 MHZ J1145+4420.ICL001.6

PLot file version 1 created 30-DEC-2005 11:40:48

Cont peak flux = 2.0590E-01 JY/BEAM Levs = 2.059E-01 * (-0.013, 0.013, 0.025, 0.050, 0.101, 0.202, 0.404, 0.807)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250