Center at RA 13 20 26.79484 DEC 01 40 36.8117

CONT: J1320+01 IPOL 1656.365 MHZ J1320+0140.ICL001.6

PLot file version 1 created 30-DEC-2005 12:17:21

Cont peak flux = 2.6622E-01 JY/BEAM Levs = 2.662E-01 * (-0.014, 0.014, 0.028, 0.056, 0.112, 0.223, 0.446, 0.893)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250